Copyright: (c) Copyright Agilent Technologies, 2000, 2001


About Product & Application Notes

Agilent Technologies regularly produces product and application notes to help you use Agilent products such as the 89600-series family of VSA analyzers.  Product notes contain information specific to a product; application notes tell you how to use a product to make a specific measurement or set of measurements.

The following Product Notes and Application Notes are provided as PDF files and contain information that will help you use Agilent 89600-series Vector Signal Analyzers.

Note

You must have the Adobe Acrobat Reader, version 3.0 or later, to view PDF files.  You can download this software for free from http://www.adobe.com.  Or, you can install it from the CD-ROM that you used to install your 89600-series VSA software—simply insert the CD-ROM in your computer's CD-ROM drive and select "Install Acrobat Reader" from the 89600 Installation Menu.

Tip

The list below includes only the most common Product and Application Notes applicable to the Agilent 89600 analyzer.  For a complete list of all Product and Application Notes, visit the Agilent 89600 [image] Web page .

Product Note 89400-2
Measuring Phase Noise with the Agilent Technologies 89400 Vector Signal Analyzers

Product Note 89400-1
Frequency and Time Selective Measurements with the Agilent Technologies 89400 Vector Signal Analyzers

Product Note 89400-8
Using Vector Modulation Analysis in the Integration, Troubleshooting and Design of Digital RF Communication Systems

Product Note 89400-14
Using Error Vector Magnitude Measurements to Analyze and Troubleshoot Vector-Modulated Signals

Product Note
Agilent 89601A Vector Signal Analyzer Software: Ultrabroadband vector signal analyzer measurements using the Agilent Infiniium oscilloscopes.

Application Note 1298
Digital Modulation in Communication Systems - An Introduction

Application Note 1313
Testing and Troubleshooting Digital RF Communications Transmitter Designs

Application Note 1356
Designing and Testing W-CDMA User Equipment

Application Note 1357
Designing and Testing cdma2000 Base Stations

Application Note 1358
Designing and Testing cdma2000 Mobile Stations

Application Note 1380-1
RF Testing of Wireless LAN Products

Application Note 1380-2
IEEE 802.11  Wireless LAN PHY Layer (RF) Operation and Measurement


How To Use This Help File

To do this...	Click...
Display or hide the navigation pane (Contents, Index, and Search tabs)...
Display the documentation roadmap...
Browse through the online topics...
View the Table of Contents…
Display the online help index...
Search for a word or phrase...
Display a history of topics that you’ve visited…
To print a single topic...
To print an entire Book…	(in the Table of Contents)
To change the displayed font size…


Acknowledgements

The following products are mentioned in one or more places in the Agilent 89600-series documentation.

Product	Acknowledgement
Adobe® and Acrobat®	These products are trademarks of Adobe Systems Incorporated.
Microsoft®, Windows NT®, Windows®, and MS Windows®	These products are U.S. registered trademarks of Microsoft Corporation.
MS Excel, MS Word, MS Office, VBScript	These products are products of Microsoft Corporation.
MATLAB	MATLAB is a product of The MathWorks, Inc.


The Documentation Roadmap is not installed on your system.


1999-2002, Agilent Technologies


This documentation is not installed on your system.


This document was not available for inclusion in the online help. You can download the PDF from the 89600 [image] Web page .


This document was not available for inclusion in the online help. You can download the PDF from the 89600 [image] Web page .


This document was not available for inclusion in the online help. You can download the PDF from the 89600 [image] Web page .